;  Logitech Two-Button Mouse Definition File for PictureThis
;  Version 1.0 - February 27, 1990
;
;  Initialization:
BEGIN LeftB, MidB, RightB, LeftM, RightM, UpM, DownM
;  Buttons do Function Keys F1, F2, and F3:
LeftB: TYPE 0, 59 ;  Left Button does F1
MidB: TYPE 0, 61 ;  Both Buttons Together do F3
;  (Note: On a Three-Button Mouse, the Middle Button Alone does F2.)
RightB: TYPE 0, 60 ;  Right Button does F2
;  Cursor Movements Horizontal and Vertical:
LeftM: TYPE 0, 75;  Left
RightM: TYPE 0, 77 ; Right
UpM: TYPE 0, 72 ; Up
DownM: TYPE 0, 80 ; Down

